FRONT SIDE

426 mm

Template
Balloon big Ø 90 cm
format: Ø 900 mm
Use this file in a sperate layer in your design program.
Don’t forget to hide or delete your template when saving the final PDF.
Format size to be submitted, Also finished size (297 x 420 mm)

303 mm