FRONT SIDE

Explanation
Flags per square metre
Example: Size: 2000 x 1000 mm
At Helloprint, we offer Panels or stickers in every size imaginable. For this reason, we are unable to give you a custom template for your design. However, we’ve put together these tips that you should keep in mind when designing your custom sized flag:
Example; Size to be submitted (2010 x 1010 mm)
(Your selected WIDTH and HEIGHT in millimeters + 5mm on all edges)
Finished size + 5 mm cutting margin (bleed)
It is advised to let the background and all of the images run through to this edge. This ensures that your printing can be cut needly and this prevents a white edge around your print.
Example; Finished size: (2000 x 1000 mm)
(Your selected WIDTH and HEIGHT in millimeters)
Your printing will be cut on these dimensions. This format will be the final size and will be delivered to you.
Safety zone (50mm)
Please make sure you keep your important images and text 50 mm clear of the cutting edges. This prevents a possible cut in the important parts, or that the images are so close to the edge that it results in a sloppy design.

2000 mm

2010 mm

1000 mm

1010 mm